
update Sys_Menu set Url='JGZL/WeldingWireRecovery.aspx' where MenuId='87D52498-9FCC-4D47-B717-4CB2CA355E31'
update Sys_Menu set Url='JGZL/ElectrodeRecovery.aspx' where MenuId='E7681A08-F21C-441B-B6BC-DF41BF2651CD'
go