update Sys_Menu set IsUsed=0 where MenuId='473A87D2-1365-4A68-BD38-06F312F81BC2'
update Sys_Menu set IsUsed=0 where MenuId='749B2E04-E4C2-4CBC-849E-FD2041135A43'
update Sys_Menu set IsUsed=0 where MenuId='C0018E8C-C88B-4E25-BCFC-F0BF3CACC63A'
update Sys_Menu set IsUsed=0 where MenuId='DC2AA8C2-82A8-4F7A-832D-9889C65AA228'
update Sys_Menu set IsUsed=0 where MenuId='CD167198-1667-4552-9876-E768C2542C30'
update Sys_Menu set IsUsed=0 where MenuId='B707B4E0-EF73-4010-A13B-59263A5029C7'
update Sys_Menu set IsUsed=0 where MenuId='27C1D718-2DC0-42A5-96C0-F7A2D0DBC5F6'
update Sys_Menu set IsUsed=0 where MenuId='BE150D8E-9BAB-4207-9CDD-5B05E847D906'
update Sys_Menu set IsUsed=0 where MenuId='0B9BFD3F-AD3A-41D0-9144-9BABCB8E8422'
update Sys_Menu set IsUsed=0 where MenuId='3478449A-681A-4DB1-8E79-598BB24DD0C4'
update Sys_Menu set IsUsed=0 where MenuId='8F15D3BE-BE21-4A6F-AD5C-2BBECEE46149'
update Sys_Menu set IsUsed=0 where MenuId='781CD912-5D14-4371-97BC-3C4773C13B38'
update Sys_Menu set SuperMenu='0' where SuperMenu='781CD912-5D14-4371-97BC-3C4773C13B38'
GO
