update sys_menu set SortIndex=10 where menuid='3517DBE2-9728-4BA0-9EA5-AE2147DB883B'

alter table Transfer_Piping
add  Descriptions nvarchar(200) NULL;

alter table Transfer_StaticEquipment
add  Descriptions nvarchar(200) NULL;

alter table Transfer_RotatingEquipment
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Instrumentation
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Electrical
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Civil_Structure
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Firefighting
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Telecom
add  Descriptions nvarchar(200) NULL;

alter table Transfer_Plumbing
add  Descriptions nvarchar(200) NULL;


update sys_menu set IsUsed=0 where menuid='CB76462E-9444-4946-B787-ECB33C21E6D0';
update sys_menu set IsUsed=0 where menuid='549DD0B6-05CB-4C75-B8F5-9AADDEDF399F';