﻿INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'现场质量数据', NULL, N'', 170, N'0', N'Menu_ZHGL', '0', '0', '1');


INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'51EA8258-C81D-4C33-B939-769450979D14', N'质量基本信息', NULL, N'ZHGL/CQMSData/CQMSBasicData.aspx', 10, N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'Menu_ZHGL', '0', '1', '1');



INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'6E1F4EF5-47CA-4DF8-B561-3C98DBD88EA2', N'焊接管理', NULL, N'ZHGL/CQMSData/WeldingData.aspx', 20, N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'Menu_ZHGL', '0', '1', '1');


INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'C9076E93-29DB-419C-8902-789163C6554A', N'现场质量检查', NULL, N'ZHGL/CQMSData/CQMSCheckData.aspx', 30, N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'Menu_ZHGL', '0', '1', '1');



INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'64FED633-2436-426B-A230-7C0038E44AD4', N'设备材料计量器具质量文件上报', NULL, N'ZHGL/CQMSData/CQMSEquipAndMachineData.aspx', 40, N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'Menu_ZHGL', '0', '1', '1');


INSERT INTO [dbo].[Sys_Menu] ([MenuId], [MenuName], [Icon], [Url], [SortIndex], [SuperMenu], [MenuType], [IsOffice], [IsEnd], [IsUsed]) 
VALUES (N'12E7E1FD-6D8D-41D8-801C-E15B68805213', N'共检点明细', NULL, N'ZHGL/CQMSData/CQMSNoticeDetailsData.aspx', 50, N'E64D67C1-BA8E-4329-AFEE-23F9BC45CDDD', N'Menu_ZHGL', '0', '1', '1');

go