CREATE TABLE [dbo].[Transfer_Instrumentation](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[INSTRUMENTATION] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Instrumentation] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Electrical](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[ELECTRICAL] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Electrical] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Civil_Structure](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NOT NULL,
	[Civil_Structure] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Civil_Structure] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Firefighting](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[Firefighting] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Firefighting] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO