ALTER TABLE Transfer_Piping ADD PWD nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD Apunchclosed nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD NDTReport nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD TemperaryMeasurement nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD FWDfinished nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD HydrostaticTest nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD Report nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD Blowingflushing nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD Systemreinstalled nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Piping ADD BlowingReport nvarchar(50)  NULL
GO	

-----------------------------------------
ALTER TABLE Transfer_StaticEquipment ADD Internalinspection  nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_StaticEquipment ADD InternalsPacking   nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_StaticEquipment ADD BOXupRecord  nvarchar(50)  NULL
GO
-----------------------------------------
ALTER TABLE Transfer_RotatingEquipment ADD Alignment  nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_RotatingEquipment ADD Motorsoloruntest   nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_RotatingEquipment ADD Standalonetest  nvarchar(50)  NULL
GO	

------------------------------------------------
ALTER TABLE Transfer_Instrumentation ADD InstallationCalibration   nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Instrumentation ADD PipingPressuretest  nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Instrumentation ADD PipingLeak  nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Instrumentation ADD PipingBlowing  nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Instrumentation ADD Looptest  nvarchar(50)  NULL
GO	
