
UPDATE SYS_MENU SET IsUsed=0 WHERE MENUID='05442049-1310-45B1-9D3D-CAAE759D8F3E';

ALTER TABLE Transfer_Electrical ADD Installation nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Electrical ADD Communicationtest nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Electrical ADD CableLaying nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Electrical ADD LoopTest nvarchar(50)  NULL
GO

------------------------------------------------------------------------
ALTER TABLE Transfer_Civil_Structure ADD Foundation nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD Mainstructure nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD Buildingdecoration nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD Equipment nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD Instrument nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD Electrical nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD FireFighting nvarchar(50)  NULL
GO

ALTER TABLE Transfer_Civil_Structure ADD HVAC nvarchar(50)  NULL
GO

-----------------------------------------------
