ALTER TABLE Transfer_Firefighting ADD Installation nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Firefighting ADD Debugging nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Firefighting ADD Acceptancecheck nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Telecom ADD Installation nvarchar(50)  NULL
GO	
ALTER TABLE Transfer_Telecom ADD Communication nvarchar(50)  NULL
GO	
ALTER TABLE Transfer_Telecom ADD CableLaying nvarchar(50)  NULL
GO	
ALTER TABLE Transfer_Telecom ADD FunctionTest nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Plumbing ADD Ndt nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Plumbing ADD Flushing nvarchar(50)  NULL
GO	

ALTER TABLE Transfer_Plumbing ADD RunningTest nvarchar(50)  NULL
GO	
