
CREATE TABLE [dbo].[Transfer_ProjectSetup](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[SN] [nvarchar](50) NULL,
	[PlantNo] [nvarchar](50) NULL,
	[PlantName] [nvarchar](200) NULL,
	[CommissioningSystem] [nvarchar](50) NULL,
	[CommissioningCodeDescription] [nvarchar](50) NULL,
	[SubCommissioningSystem] [nvarchar](50) NULL,
	[SubCommissioningCodeDescription] [nvarchar](50) NULL,
	[DescriptionArea] [nvarchar](50) NULL,
	[TurnoverSystemSequenceNumber] [nvarchar](50) NULL,
	[Description] [nvarchar](50) NULL,
	[TurnoverCode] [nvarchar](50) NULL,
	[TurnoverDescription] [nvarchar](50) NULL,
	[Remark] [nvarchar](200) NULL,
 CONSTRAINT [PK_Transfer_ProjectSetup] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'ProjectSetup' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'Transfer_ProjectSetup'
GO





CREATE TABLE [dbo].[Transfer_Instrumentation](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[INSTRUMENTATION] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Instrumentation] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Electrical](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[ELECTRICAL] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Electrical] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Civil_Structure](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NOT NULL,
	[Civil_Structure] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Civil_Structure] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO

CREATE TABLE [dbo].[Transfer_Firefighting](
	[Id] [nvarchar](50) NOT NULL,
	[ProjectId] [nvarchar](50) NULL,
	[Firefighting] [nvarchar](50) NULL,
	[SystemName] [nvarchar](50) NULL,
	[Subsystem] [nvarchar](50) NULL,
	[Test_Package] [nvarchar](50) NULL,
	[Test_Package_START] [datetime] NULL,
	[Test_Package_FINISH] [datetime] NULL,
	[FINAL_Status] [nvarchar](50) NULL,
 CONSTRAINT [PK_Firefighting] PRIMARY KEY CLUSTERED 
(
	[Id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO