


--企业大检查移到督查管理下
update Sys_Menu set MenuType = 'Menu_System_Hsse_S_DCGL' where MenuId ='CD9FC4C8-4B02-4619-8B02-50DA6AE6146E'   and  MenuType = 'Menu_System_Hsse_S_Hsse';


--企业大检查下面的企业安全检查,企业安全检查记录也移到督查管理下
update Sys_Menu set MenuType = 'Menu_System_Hsse_S_DCGL' where  MenuId ='73283863-CF67-44CA-9DF8-67071734A528'  and  MenuType = 'Menu_System_Hsse_S_Hsse';
update Sys_Menu set MenuType = 'Menu_System_Hsse_S_DCGL' where MenuId ='C46C007E-A100-4A52-9317-3B885442E130'   and  MenuType = 'Menu_System_Hsse_S_Hsse';



--隐藏掉原来的安全监督检查报告
update Sys_Menu set IsUsed = '0' where MenuId ='40387C48-95A0-435C-82FB-57AF0A81B9D4' and  MenuType = 'Menu_System_Hsse_S_Hsse';

--隐藏原来的安全监督检查整改
update Sys_Menu set IsUsed = '0' where MenuId ='A02E0365-383C-49A0-BF1A-B3E42052959B' and  MenuType = 'Menu_System_Hsse_S_Hsse';



--隐藏问题类别定义
update Sys_Menu set IsUsed = '0' where MenuId ='3044D68E-5018-4B57-BFC4-FBE4BCCA8B8B';

--隐藏执业资格证书定义
update Sys_Menu set IsUsed = '0' where MenuId ='1390195D8-874B-4E7B-8DBF-D81A5984E973'


--隐藏合同设置
update Sys_Menu set IsUsed = '0' where MenuId ='24A40837-0756-49B0-8B3C-EFB8A9879336';



--隐藏作业人员角色定义
update Sys_Menu set IsUsed = '0' where MenuId ='4AEA28ED-327C-4A8F-977D-BB56F423CEA4';

--隐藏管理人员角色定义
update Sys_Menu set IsUsed = '0' where MenuId ='145523FE-B49A-4420-9DFB-565A79F4AF36';



--隐藏质量月
update Sys_Menu set IsUsed = '0' where MenuId ='B6A867A0-3EBB-4EFC-8BCC-050816547BBE' and  MenuType = 'Menu_System_Hsse_P_Hsse';
update Sys_Menu set IsUsed = '0' where MenuId ='ED3846F3-B677-4958-A85C-BF235909B071' and  MenuType = 'Menu_System_Hsse_S_Hsse';
