INSERT INTO Sys_Menu (MenuId,MenuName,Icon,Url,SortIndex,SuperMenu,MenuType,IsOffice,IsEnd,IsUsed)
VALUES (N'E642C8A1-5D56-4A0C-89E2-304E0421D281',N'管道材料信息总览',NULL,N'HJGL/InfoQuery/MaterialOverview.aspx',30,N'43F92EA7-462F-41E6-8D8A-243C03A5317E',N'Menu_HJGL',0,1,1);
GO
INSERT INTO Sys_Menu (MenuId,MenuName,Icon,Url,SortIndex,SuperMenu,MenuType,IsOffice,IsEnd,IsUsed)
VALUES (N'B5DD3FA8-28F9-49F4-AF3E-9916A65A1C7F',N'管长信息总览',NULL,N'HJGL/InfoQuery/PipeLengthOverview.aspx',40,N'43F92EA7-462F-41E6-8D8A-243C03A5317E',N'Menu_HJGL',0,1,1);
GO