update Sys_Menu set  SortIndex='10' where MenuId='ADC7EA61-6313-4DF9-913F-E9207F6525CA'
update Sys_Menu set  SortIndex='20' where MenuId='164E056C-30C9-4C29-A6B6-AF0F0C943A59'
update Sys_Menu set  SortIndex='30' where MenuId='C1EACB23-A029-4DE7-886D-7772D9DDE735'
update Sys_Menu set  SortIndex='40' where MenuId='6ce0b6bc-aa4d-4f0d-9f1f-75a553810793'
update Sys_Menu set SuperMenu='4D36E99E-B3D8-4C61-826A-CBD98EC51515', SortIndex='50' where MenuId='D1B5A8B7-5D2A-4C51-9B7E-6A2F15B7F002'
update Sys_Menu set SuperMenu='4D36E99E-B3D8-4C61-826A-CBD98EC51515', SortIndex='60' where MenuId='D1B5A8B7-5D2A-4C51-9B7E-6A2F15B7F003'
update Sys_Menu set  SortIndex='70' where MenuId='5TYHMD2F-2582-4DEB-905E-6E9DCFEFBGHO'
update Sys_Menu set  IsUsed=0 where MenuId='E6F6982A-48C7-455C-8EBB-CC7088EBF15A'
update Sys_Menu set  IsUsed=0 where MenuId='D1B5A8B7-5D2A-4C51-9B7E-6A2F15B7F001'
update Sys_Menu set  IsUsed=0 where MenuId='53948077-B51D-4FF3-BFB0-AB4E27C42875'
update Sys_Menu set  IsUsed=0 where MenuId='EFD1E914-E79C-4F5E-A2F7-CFF4F7821284'
update Sys_Menu set SortIndex='130' where MenuId='43F92EA7-462F-41E6-8D8A-243C03A5317E'