 ALTER TABLE  HJGL_WeldAppearanceCheck DROP CONSTRAINT FK_HJGL_WeldAppearanceCheck_WeldJoint;
 ALTER TABLE  HJGL_Pipeline ALTER COLUMN PaintId nvarchar(50) COLLATE Chinese_PRC_CI_AS NULL;
