Alter TABLE [dbo].[Base_Project]add
	[DataSource] [varchar](50) NULL 

	Alter TABLE [dbo].[Base_Unit]add
	[DataSource] [varchar](50) NULL 

	 Alter TABLE [dbo].[Base_Depart]add
	[SuperDepartId] [nvarchar](50)  NULL, 
	[DataSource] [nvarchar](50)  NULL 

	Alter TABLE [dbo].[Project_Installation] add
	[DataSource] [nvarchar](50)  NULL 

	Alter TABLE [dbo].[ProjectData_WorkArea] add
	[DataSource] [nvarchar](50)  NULL 
	 
 Alter  TABLE [dbo].[Environmental_EnvironmentalMonitoring]add
    [deviceId] [nvarchar](50) NULL, 
	[UpdateDate] [datetime] NULL,
	[pm25] [float] NULL,
	[pm10] [float] NULL,
	[noise] [float] NULL,
	[tem] [float] NULL,
	[hum] [float] NULL,
	[wp] [float] NULL,
	[ws] [float] NULL,
	[wd8] [float] NULL,
	[wd360] [float] NULL,
	[tsp] [float] NULL,
	[atm] [float] NULL,
	[lux] [float] NULL,
	[co] [float] NULL,
	[so2] [float] NULL,
	[no2] [float] NULL,
	[o3] [float] NULL
