 

CREATE TABLE [dbo].[Hazard_RealTime](
	[ID] [nvarchar](50) NOT NULL,
	[UnitId] [nvarchar](50) NULL,
	[UnitName] [nvarchar](50) NULL,
	[HazardName] [nvarchar](50) NULL,
	[HazardLevel] [nvarchar](50) NULL,
	[DeviceCode] [nvarchar](50) NULL,
	[DeviceName] [nvarchar](50) NULL,
	[DeviceType] [nvarchar](50) NULL,
	[SphereType] [nvarchar](50) NULL,
	[TemperatureType] [nvarchar](50) NULL,
	[DesignTemperantureMax] [nvarchar](50) NULL,
	[DesignTemperantureMin] [nvarchar](50) NULL,
	[PressureType] [nvarchar](50) NULL,
	[DesignPressure] [nvarchar](50) NULL,
	[DesignPressureMax] [nvarchar](50) NULL,
	[Medium] [nvarchar](50) NULL,
	[MediumForm] [nvarchar](50) NULL,
	[MediumLevelMax] [nvarchar](50) NULL,
	[Reserves] [nvarchar](50) NULL,
	[StandardCode] [nvarchar](50) NULL,
	[StandardName] [nvarchar](50) NULL,
	[StandardType] [nvarchar](50) NULL,
	[StandardDes] [nvarchar](500) NULL,
	[MeasurementUnit] [nvarchar](50) NULL,
	[MeterMax] [nvarchar](50) NULL,
	[MeterMin] [nvarchar](50) NULL,
	[ThresholdLow1] [nvarchar](50) NULL,
	[ThresholdLow2] [nvarchar](50) NULL,
	[ThresholdMax1] [nvarchar](50) NULL,
	[ThresholdMax2] [nvarchar](50) NULL,
	[BitNum] [nvarchar](50) NULL,
	[DateTime] [datetime] NULL,
 CONSTRAINT [PK_Hazard] PRIMARY KEY CLUSTERED 
(
	[ID] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]

GO


